\ \\Table~\ref{tab1}. Image Parameters and Derived Fluxes. \\%
\medskip
\begin{tabular}{ccccccc}
\tableline\tableline
Exposure & Start & Exposure & \Oone\ \lam1304 & \Oone]\,\lam1356 & Ratio & Projected \\
ID & Time (UT) & Time (s) & Flux\tablenotemark{a} & Flux\tablenotemark{a}
 & \lam1356/\lam1304 & Angle of $B_J$\tablenotemark{b} \\
\tableline
O53K01010  & 8:21:19 &   850.0  & $12.5 \pm 2.1$ & $19.5 \pm 2.3$ & $1.6 \pm 0.3$ & 17.1 \\
O53K01020  & 8:38:57 &   850.0  & $11.5 \pm 2.0$ & $25.1 \pm 2.3$ & $2.2 \pm 0.4$ & 15.8 \\[6pt]
O53K01030  & 9:40:09 &  1205.0  & $14.5 \pm 5.3$ & $22.5 \pm 2.2$ & $1.5 \pm 0.6$ & 7.8 \\
O53K01040  & 10:07:22 &  1205.0 & $10.4 \pm 1.8$ & $17.5 \pm 2.0$ & $1.7 \pm 0.3$ & 3.3 \\[6pt]
O53K01050  & 11:16:55 &  1125.0 & $11.6 \pm 5.7$ & $37.7 \pm 2.7$ & $3.2 \pm 1.6$ & --8.2 \\
O53K01060  & 11:42:48 & 1100.0 & $20.5 \pm 2.2$ & $30.4 \pm 2.4$ & $1.5 \pm 0.2$ & --11.6 \\[6pt]
O53K01070  & 12:53:42 & 1200.0 & $22.1 \pm 5.6$ & $26.1 \pm 2.6$ & $1.2 \pm 0.3$ & --17.0 \\
O53K01080  & 13:17:10 & 1130.0 & $16.5 \pm 2.3$ & $20.2 \pm 2.4$ & $1.2 \pm 0.2$ & --17.2 \\
\tableline
\end{tabular}
%\tablenotetext{a}{$10^{-5} \phots$.  Quoted errors are $1\sigma$ statistical
%uncertainty.}
%\tablenotetext{b}{in degrees measured east of Jovian north (south pole).}





